@INPROCEEDINGS{7525267, 
	author={A. Belloni and L. Piroddi and M. Prandini}, 
	booktitle={2016 American Control Conference (ACC)}, 
	title={A stochastic optimal control solution to the energy management of a microgrid with storage and renewables}, 
	year={2016}, 
	pages={2340-2345}, 
	keywords={Markov processes;distributed power generation;dynamic programming;energy management systems;energy storage;renewable energy sources;stochastic programming;wind turbines;Markov chain model;approximate dynamic programming approach;battery;control policy design;energy management;energy production;energy storage element;microgrid;optimal management;renewable energy generators;stochastic optimal control solution;storage units;system abstraction;wind power production;wind turbine facility;Batteries;Energy management;Microgrids;Stochastic processes;Wind power generation;Wind speed;Wind turbines}, 
	doi={10.1109/ACC.2016.7525267}, 
	month={July},}

