@INPROCEEDINGS{7525464, 
	author={P. Dimitrov and L. Piroddi and M. Prandini}, 
	booktitle={2016 American Control Conference (ACC)}, 
	title={Distributed allocation of a shared energy storage system in a microgrid}, 
	year={2016}, 
	pages={3551-3556}, 
	keywords={battery storage plants;demand side management;distributed power generation;energy storage;government policies;iterative methods;power distribution control;power distribution economics;power system management;ESS;demand production mismatches;distributed allocation;distributed control policies;distributed energy management;economic management;iterative resource allocation mechanism;microgrid;renewable sources;resource allocation policies;shared energy storage system;virtual load deferral systems;Batteries;Buildings;Microgrids;Production;Resource management;State of charge}, 
	doi={10.1109/ACC.2016.7525464}, 
	month={July},}
