@INPROCEEDINGS{7505308, 
	author={D. Ioli and A. Falsone and S. Schuler and M. Prandini}, 
	booktitle={2016 12th IEEE International Conference on Control and Automation (ICCA)}, 
	title={A compositional framework for energy management of a smart grid: A scalable stochastic hybrid model for cooling of a district network}, 
	year={2016}, 
	pages={389-394}, 
	keywords={cooling;cost reduction;energy management systems;smart power grids;stochastic processes;compositional modeling framework;district network cooling;electrical energy cost minimization;electrical energy profile;energy exchange;energy fluxes;energy management;scalable stochastic hybrid model;smart grid;Buildings;Cooling;Energy management;Production;Resistance heating;Smart grids}, 
	doi={10.1109/ICCA.2016.7505308}, 
	month={June},}

