@inbook{e414d5ed6c994ea587c75da5a91b57d0,
	title = "A Chance-Constrained Approach to the Quantized Control of a Heat Ventilation and Air Conditioning System with Prioritized Constraints",
	keywords = "",
	author = "C. Brocchini, A. Falsone, G. Manganini, O. Holub, M. Prandini",
	year = "2016",
	pages = "",
	booktitle = "Proceedings of the 22nd International Symposium on Mathematical Theory of Networks and Systems",
}

